NEW$:
T:This is the Diagnostics and Trouble-Shooting menu, the one that
T:allows you to verify the quality of both your computer equipment
T:and your magnetic media.  You use this menu when you want to try
T:to recover data from damaged or unreliable media, and when you
T:have to resort to using an unSUPERVYZed system.  IT IS STRONGLY
T:RECOMMENDED THAT ONLY VERY EXPERIENCED OPERATORS USE THIS MENU.
T:
T:You can choose among the items on the list by typing a number
T:between zero and ten when the computer asks for your choice.  For
T:some choices, the computer may ask you for more information.
T:
T:
T:
T:
T:
T:
T:
T:
*MORE
T:
T:Do you want to know more about the "Diagnostics and Touble-Shooting" Menu?
U:*YORN
JN:*EXIT
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
R:THIS IS WHERE YOU PRESENT A COPY OF THE MENU DISPLAY - MAKE IT EXACT.
R:
T:                    0) Diagnostics and Trouble-Shooting
T:
T:  1) Verify Disk Quality                 6)                                  
T:  2) Disk Data Recovery                  7)                                 
T:  3) Direct Operating System Commands    8)                                 
T:  4) Disengage SUPERVYZ and SUPERCCP     9)                                 
T:  5) Manufacturer's Diagnostics         10)                                  
T:
T:
T:
T:
T:
T:
T:
T:
*ASK
T:
T:Choose the function you want explained by typing its number (0-10):
A:#X
C:X=X+1
T:
T:

*MENU00
C:X=X-1
J(X):*MENU01
R:THIS IS WHERE YOU EXPLAIN FUNCTION 0
T:Function 0 returns to the "SUPERVYZ Function Selection" Menu.
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
J:*MORE

*MENU01
C:X=X-1
J(X):*MENU02
R:THIS IS WHERE YOU EXPLAIN FUNCTION 1
T:Function 1, "Verify Disk Quality", checks your magnetic media
T:to see if it contains valid data and format information.  This
T:procedure uses the "DUMP" program written by Sam J. Singer and
T:donated to the CP/M User's Group.  This disk validation leaves
T:all data unharmed.
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
J:*MORE

*MENU02
C:X=X-1
J(X):*MENU03
R:THIS IS WHERE YOU EXPLAIN FUNCTION 2
T:Function 2, "Disk Data Recovery", allows a programmer to modify
T:information stored on your disk.  This capability is both very
T:useful and extremely hazardous.  If you do not know what an FCB
T:looks like, and if you don't know what a Group-Cluster is, save
T:yourself some grief and stay away from this function.
T:
T:The DUMP22 program invoked by this function contains a list of its
T:commands.  If you "EDIT" a sector, you specify the address within
T:the sector where you want to begin making changes by entering a four-
T:digit address and then press "RETURN".  The current contents of that
T:address are displayed, and you may either enter a hexadecimal value
T:to replace the current value, you may press "RETURN" to leave it alone,
T:or you may enter a period (".") followed by "RETURN" to end substitution.
T:
T:To stop editing a sector, enter the command "WRITE" to update the disk
T:or "STOP" to leave the disk unaffected.
T:
T:
J:*MORE

*MENU03
C:X=X-1
J(X):*MENU04
R:THIS IS WHERE YOU EXPLAIN FUNCTION 3
T:Function 3, "Direct Operating System Commands", allows you to
T:send your own ad-hoc instructions to your Operating System, but
T:via Epic's SUPER-Console-Command-Processor.  This means that you
T:can send multiple logical commands at one time by separating each
T:pair of commands with a concatenation-symbol ("|"), and you can
T:specify the console-input a program shall receive by enclosing it
T:within braces "{like this}".  Control-characters within the braces
T:are specified by the caret ("^") preceeding the uppercase or lowercase
T:character, like "^z" for control-Z.
T:
T:The extra intrinsic ("built-in") functions of the SUPERCCP are:
T:  ;     -  treats the rest of the command as displayable comments
T:  GET   -  loads transient program into TPA without executing it
T:  GO    -  executes program in TPA and can take command parameters
T:  LOG   -  makes the specified drive "on-line"
T:  UNYZ  -  disengages the SUPERVYZ and SUPERCCP programs
T:  WAIT  -  asks for and waits until a key is pressed
T:
J:*MORE

*MENU04
C:X=X-1
J(X):*MENU05
R:THIS IS WHERE YOU EXPLAIN FUNCTION 4
T:Function 4, "Disengage SUPERVYZ and SUPERCCP", removes the menu
T:control from your computer system, leaving you totally at the
T:mercy of the Operating System.  Once this function is invoked,
T:the SUPERVYZ system may be reengaged by loading and running the
T:"SUPERCCP" program.
T:
T:This drastic action is sometimes necessary if you have a program
T:that requires your entire memory space.
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
J:*MORE

*MENU05
C:X=X-1
J(X):*MENU06
R:THIS IS WHERE YOU EXPLAIN FUNCTION 5
T:Function 5, "Manufacturer's Diagnostics", is reserved for
T:those hardware-specific support programs that come with most
T:computers.  Typical items would be memory tests, disk tests,
T:printer tests, and CRT tests.
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
J:*MORE

*MENU06
C:X=X-1
J(X):*MENU07
R:THIS IS WHERE YOU EXPLAIN FUNCTION 6
T:Function 6 is available for you to set-up.
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
J:*MORE

*MENU07
C:X=X-1
J(X):*MENU08
R:THIS IS WHERE YOU EXPLAIN FUNCTION 7
T:Function 7 is available for you to set-up.
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
J:*MORE

*MENU08
C:X=X-1
J(X):*MENU09
R:THIS IS WHERE YOU EXPLAIN FUNCTION 8
T:Function 8 is available for you to set-up.
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
J:*MORE

*MENU09
C:X=X-1
J(X):*MENU10
R:THIS IS WHERE YOU EXPLAIN FUNCTION 9
T:Function 9 is available for you to set-up.
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
J:*MORE

*MENU10
C:X=X-1
J(X):*ASK
R:THIS IS WHERE YOU EXPLAIN FUNCTION 10
T:Function 10 is available for you to set-up.
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
T:
J:*MORE

*YORN
T:Type "Y" for yes or "N" for no; then press "Return", "CR", or "Enter":
A:
M:Y,N
JN:*YORN
M:Y
E:
*EXIT
BYE:
